<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\documentclass[12pt,a4paper]{article}
\usepackage[spanish]{babel}
\usepackage{hyperref}
\usepackage{graphicx}
\usepackage{subcaption}

\title{Tema VI Ejercicio I: Fabricantes de Reconocido Prestigio}
\author{Nicolás A. Ortega Froysa}

\begin{document}
\maketitle
\pagebreak
\tableofcontents
\pagebreak

\section{Racks}
\begin{table}[!htb]
	\centering
	\begin{tabular}{|c|c|c|c|c|}
		\hline
		{\bf Marca} &amp; {\bf Modelo} &amp; {\bf Altura} &amp; {\bf Anchura} &amp; {\bf Precio} \\ \hline
		Great Lakes &amp; GL910ENT-4048SSS &amp; 48 uds. &amp; 40'' &amp; \$5245.33 \\ \hline
		Eaton &amp; RS RSV4882B &amp; 48 uds. &amp; 31.5'' &amp; \$2366.94 \\ \hline
		APC &amp; NetShelter SX &amp; 48 uds. &amp; 30'' &amp; \$2896.55 \\ \hline
	\end{tabular}
	\caption{Comparación de {\em racks}.}
\end{table}

\section{Switches}
\begin{table}[!htb]
	\centering
	\begin{tabular}{|c|c|c|c|}
		\hline
		{\bf Marca} &amp; {\bf Modelo} &amp; {\bf Puertos SFP} &amp; {\bf Puertos BASE-T} \\ \hline
		Cisco &amp; Catalyst IE-9320-26S2C &amp; $\times$26 &amp; $\times$2 \\ \hline
		D-Link &amp; DIS-200G-12SW &amp; $\times$2 &amp; $\times$10 \\ \hline
		Emerson &amp; IC086SLM162 &amp; $\times$2 &amp; $\times$16 \\ \hline
	\end{tabular}
	\caption{Comparación de {\em switches}.}
\end{table}

\section{Conductos}
\begin{table}[!htb]
	\centering
	\begin{tabular}{|c|c|c|c|}
		\hline
		{\bf Marca} &amp; {\bf Modelo} &amp; {\bf Longitud} &amp; {\bf Precio}\\ \hline
		StarTech &amp; CMVER20UF &amp; 3' &amp; \$62.88 \\ \hline
		UMTELE &amp; L1 &amp; 15.4'' &amp; \$22.59 \\ \hline
		NavePoint &amp; 4330219210 &amp; 21'' &amp; \$33.85 \\ \hline
	\end{tabular}
	\caption{Comparación de conductos ({\em cable ducts}).}
\end{table}

\pagebreak

\section{Rosetas}
\begin{table}[!htb]
	\centering
	\begin{tabular}{|c|c|c|c|}
		\hline
		{\bf Marca} &amp; {\bf Modelo} &amp; {\bf Puertos RJ-45} &amp; {\bf Precio} \\ \hline
		AISENS &amp; A139-0301 &amp; 1 &amp; 5.90€ \\ \hline
		NanoCable &amp; 10.21.1102 &amp; 2 &amp; 5.30€ \\ \hline
		KWMobile &amp; 50454.02.02\_m000142 &amp; 2 &amp; 8€ \\ \hline
	\end{tabular}
	\caption{Comparación de cajas {\em roseta} ({\em junction boxes}).}
\end{table}

\section{Cajas de Registro}
\begin{table}[!htb]
	\centering
	\begin{tabular}{|c|c|c|c|c|}
		\hline
		{\bf Marca} &amp; {\bf Modelo} &amp; {\bf Dimensiones} &amp; {\bf Entradas} &amp; {\bf Precio} \\ \hline
		LEGRAND &amp; 3M Idrobox IP55 &amp; $63\times100\times76$ mm &amp; 5 &amp; 6.49€ \\ \hline
		SIMON &amp; S270 &amp; $55\times104\times72$ &amp; N/A &amp; 5.29€ \\ \hline
	\end{tabular}
	\caption{Comparación de cajas de registro.}
\end{table}

\section{Cables de Red}
\begin{table}[!htb]
	\centering
	\begin{tabular}{|c|c|c|c|c|}
		\hline
		{\bf Marca} &amp; {\bf Modelo} &amp; {\bf Longitud} &amp; {\bf Precio} \\ \hline
		MutecPower &amp; 102 &amp; 30m &amp; 24.59€ \\ \hline
		KabelDirekt &amp; 627 &amp; 30m &amp; 11.10€ \\ \hline
		MEIPEK &amp; Cable6-BD &amp; 30m &amp; 20.99€ \\ \hline
	\end{tabular}
	\caption{Comparación de cables de red.}
\end{table}

\pagebreak

\section{Derechos de Autor y Licencia}

\noindent
Copyright \copyright\ \the\year\ Nicolás A. Ortega Froysa &lt;nicolas@ortegas.org&gt;
\\
Este documento se distribuye bajo los términos y condiciones de la licencia
Creative Commons Attribution No Derivatives 4.0 International.

\end{document}
</pre></body></html>